
diff -r 7fdc9a71d314 -r 8ad140f3dd41 stif/TestCombiner/Bmarm/testcombineru.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/stif/TestCombiner/Bmarm/testcombineru.def	Wed Oct 13 16:17:58 2010 +0300
@@ -0,0 +1,3 @@
+EXPORTS
+	LibEntryL__Fv @ 1 NONAME R3UNUSED ; LibEntryL(void)
+




