
diff -r a9c038d69df8 -r 8f8df8006c40 stif/TestServer/eabi/StifTestServeru.def
--- a/stif/TestServer/eabi/StifTestServeru.def	Wed Jun 09 11:23:41 2010 +0300
+++ b/stif/TestServer/eabi/StifTestServeru.def	Mon Jun 21 17:25:56 2010 +0300
@@ -60,4 +60,5 @@
 	_ZN14RTestExecution14NotifyCommand2ER5TPckgI8TCommandER5TDes8R14TRequestStatusi @ 59 NONAME
 	_ZTI11CCommandDef @ 60 NONAME ; #<TI>#
 	_ZTV11CCommandDef @ 61 NONAME ; #<VT>#
+	_ZN14RTestExecution11RunTestCaseER5TPckgI15TFullTestResultERK7TDesC16R14TRequestStatus @ 62 NONAME
 




