
diff -r b58b1294947a -r 1ea875759131 stif/TestInterface/eabi/StifTestInterfaceu.def
--- a/stif/TestInterface/eabi/StifTestInterfaceu.def	Mon Jun 21 22:45:06 2010 +0100
+++ b/stif/TestInterface/eabi/StifTestInterfaceu.def	Thu Jul 22 16:50:07 2010 +0100
@@ -183,4 +183,5 @@
 	_ZN11CScriptBase13SetLocalValueERK7TDesC16S2_ @ 182 NONAME
 	_ZN11CScriptBase13SetLocalValueERK7TDesC16d @ 183 NONAME
 	_ZN11CScriptBase13SetLocalValueERK7TDesC16i @ 184 NONAME
+	_ZNK13CTestModuleIf20GetTestCaseArgumentsEv @ 185 NONAME
 




