EXPORTS
	?LibEntryL@@YAPAVCStifHWResetStub@@XZ @ 1 NONAME ; class CStifHWResetStub * __cdecl LibEntryL(void)
	?NewL@CStifHWResetStub@@SAPAV1@XZ @ 2 NONAME ; public: static class CStifHWResetStub * __cdecl CStifHWResetStub::NewL(void)

