
diff -r 000000000000 -r 20abbd395761 stif/TestServer/BMARM/StifTestServeru.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/stif/TestServer/BMARM/StifTestServeru.def	Wed Aug 25 15:52:14 2010 +0300
@@ -0,0 +1,25 @@
+EXPORTS
+	__11RTestServer @ 1 NONAME R3UNUSED ; RTestServer::RTestServer(void)
+	CancelAsyncRequest__14RTestExecutioni @ 2 NONAME R3UNUSED ; RTestExecution::CancelAsyncRequest(int)
+	Close__11RTestModule @ 3 NONAME R3UNUSED ; RTestModule::Close(void)
+	Close__11RTestServer @ 4 NONAME R3UNUSED ; RTestServer::Close(void)
+	Close__14RTestExecution @ 5 NONAME R3UNUSED ; RTestExecution::Close(void)
+	Connect__11RTestServerRCt4TBuf1i256RC7TDesC16 @ 6 NONAME R3UNUSED ; RTestServer::Connect(TBuf<256> const &, TDesC16 const &)
+	EnumerateTestCases__11RTestModuleR7TDesC16Rt8TPckgBuf1ZiR14TRequestStatus @ 7 NONAME ; RTestModule::EnumerateTestCases(TDesC16 &, TPckgBuf<int> &, TRequestStatus &)
+	ErrorNotification__11RTestModuleRt5TPckg1Z18TErrorNotificationR14TRequestStatus @ 8 NONAME R3UNUSED ; RTestModule::ErrorNotification(TPckg<TErrorNotification> &, TRequestStatus &)
+	GetTestCases__11RTestModuleRt15CFixedFlatArray1Z13TTestCaseInfo @ 9 NONAME R3UNUSED ; RTestModule::GetTestCases(CFixedFlatArray<TTestCaseInfo> &)
+	NotifyEvent__14RTestExecutionRt5TPckg1Z8TEventIfR14TRequestStatusi @ 10 NONAME ; RTestExecution::NotifyEvent(TPckg<TEventIf> &, TRequestStatus &, int)
+	NotifyProgress__14RTestExecutionRt5TPckg1Z13TTestProgressR14TRequestStatus @ 11 NONAME R3UNUSED ; RTestExecution::NotifyProgress(TPckg<TTestProgress> &, TRequestStatus &)
+	NotifyRemoteCmd__14RTestExecutionRt5TPckg1Z12TStifCommandRt5TPckg1ZiR14TRequestStatus @ 12 NONAME ; RTestExecution::NotifyRemoteCmd(TPckg<TStifCommand> &, TPckg<int> &, TRequestStatus &)
+	Open__11RTestModuleR11RTestServerRt4TBuf1i256 @ 13 NONAME R3UNUSED ; RTestModule::Open(RTestServer &, TBuf<256> &)
+	Open__14RTestExecutionR11RTestServeriRCt4TBuf1i256 @ 14 NONAME ; RTestExecution::Open(RTestServer &, int, TBuf<256> const &)
+	Pause__14RTestExecution @ 15 NONAME R3UNUSED ; RTestExecution::Pause(void)
+	ReadRemoteCmdInfo__14RTestExecutionR5TDes812TStifCommandi @ 16 NONAME ; RTestExecution::ReadRemoteCmdInfo(TDes8 &, TStifCommand, int)
+	Resume__14RTestExecution @ 17 NONAME R3UNUSED ; RTestExecution::Resume(void)
+	RunTestCase__14RTestExecutionRt5TPckg1Z15TFullTestResultR14TRequestStatus @ 18 NONAME R3UNUSED ; RTestExecution::RunTestCase(TPckg<TFullTestResult> &, TRequestStatus &)
+	StartNewServer__FRCt4TBuf1i256Rt4TBuf1i256 @ 19 NONAME R3UNUSED ; StartNewServer(TBuf<256> const &, TBuf<256> &)
+	StartNewServer__FRCt4TBuf1i256Rt4TBuf1i256iG10RSemaphore @ 20 NONAME ; StartNewServer(TBuf<256> const &, TBuf<256> &, int, RSemaphore)
+	Version__C11RTestServer @ 21 NONAME R3UNUSED ; RTestServer::Version(void) const
+	CancelAsyncRequest__11RTestModulei @ 22 NONAME R3UNUSED ; RTestModule::CancelAsyncRequest(int)
+	GetServerThreadId__11RTestServerR9TThreadId @ 23 NONAME R3UNUSED ; RTestServer::GetServerThreadId(TThreadId &)
+




