EXPORTS
	__14RSettingServer @ 1 NONAME R3UNUSED ; RSettingServer::RSettingServer(void)
	AddTestModule__11RTestEngineRCt4TBuf1i128RCt4TBuf1i256 @ 2 NONAME R3UNUSED ; RTestEngine::AddTestModule(TBuf<128> const &, TBuf<256> const &)
	CancelAsyncRequest__11RTestEnginei @ 3 NONAME R3UNUSED ; RTestEngine::CancelAsyncRequest(int)
	CancelAsyncRequest__9RTestCasei @ 4 NONAME R3UNUSED ; RTestCase::CancelAsyncRequest(int)
	Close__11RTestEngine @ 5 NONAME R3UNUSED ; RTestEngine::Close(void)
	Close__14RSettingServer @ 6 NONAME R3UNUSED ; RSettingServer::Close(void)
	Close__17RTestEngineServer @ 7 NONAME R3UNUSED ; RTestEngineServer::Close(void)
	Close__9RTestCase @ 8 NONAME R3UNUSED ; RTestCase::Close(void)
	Connect__14RSettingServer @ 9 NONAME R3UNUSED ; RSettingServer::Connect(void)
	Connect__17RTestEngineServer @ 10 NONAME R3UNUSED ; RTestEngineServer::Connect(void)
	EnumerateTestCases__11RTestEngineRt8TPckgBuf1ZiR14TRequestStatus @ 11 NONAME R3UNUSED ; RTestEngine::EnumerateTestCases(TPckgBuf<int> &, TRequestStatus &)
	ErrorNotification__11RTestEngineRt5TPckg1Z18TErrorNotificationR14TRequestStatus @ 12 NONAME R3UNUSED ; RTestEngine::ErrorNotification(TPckg<TErrorNotification> &, TRequestStatus &)
	Event__11RTestEngineRt5TPckg1Z8TEventIfR14TRequestStatus @ 13 NONAME R3UNUSED ; RTestEngine::Event(TPckg<TEventIf> &, TRequestStatus &)
	GetBooleanSettingsL__26CSTIFTestFrameworkSettingsP18CStifSectionParserG7TPtrC16Ri @ 14 NONAME ; CSTIFTestFrameworkSettings::GetBooleanSettingsL(CStifSectionParser *, TPtrC16, int &)
	GetFileSetting__26CSTIFTestFrameworkSettingsP18CStifSectionParserG7TPtrC16R7TPtrC16 @ 15 NONAME ; CSTIFTestFrameworkSettings::GetFileSetting(CStifSectionParser *, TPtrC16, TPtrC16 &)
	GetFormatL__26CSTIFTestFrameworkSettingsP18CStifSectionParserG7TPtrC16RQ211CStifLogger11TLoggerType @ 16 NONAME ; CSTIFTestFrameworkSettings::GetFormatL(CStifSectionParser *, TPtrC16, CStifLogger::TLoggerType &)
	GetLoggerSettings__14RSettingServerR15TLoggerSettings @ 17 NONAME R3UNUSED ; RSettingServer::GetLoggerSettings(TLoggerSettings &)
	GetOutputL__26CSTIFTestFrameworkSettingsP18CStifSectionParserG7TPtrC16RQ211CStifLogger7TOutput @ 18 NONAME ; CSTIFTestFrameworkSettings::GetOutputL(CStifSectionParser *, TPtrC16, CStifLogger::TOutput &)
	GetOverwriteL__26CSTIFTestFrameworkSettingsP18CStifSectionParserG7TPtrC16Ri @ 19 NONAME ; CSTIFTestFrameworkSettings::GetOverwriteL(CStifSectionParser *, TPtrC16, int &)
	GetReportModeL__26CSTIFTestFrameworkSettingsP18CStifSectionParserG7TPtrC16RUi @ 20 NONAME ; CSTIFTestFrameworkSettings::GetReportModeL(CStifSectionParser *, TPtrC16, unsigned int &)
	GetTestCases__11RTestEngineRt15CFixedFlatArray1Z9TTestInfo @ 21 NONAME R3UNUSED ; RTestEngine::GetTestCases(CFixedFlatArray<TTestInfo> &)
	NewL__26CSTIFTestFrameworkSettings @ 22 NONAME R3UNUSED ; CSTIFTestFrameworkSettings::NewL(void)
	NotifyProgress__9RTestCaseRt5TPckg1Z13TTestProgressR14TRequestStatus @ 23 NONAME R3UNUSED ; RTestCase::NotifyProgress(TPckg<TTestProgress> &, TRequestStatus &)
	NotifyRemoteMsg__9RTestCaseR5TDes812TStifCommand @ 24 NONAME R3UNUSED ; RTestCase::NotifyRemoteMsg(TDes8 &, TStifCommand)
	NotifyRemoteType__9RTestCaseRt5TPckg1Z12TStifCommandRt5TPckg1ZiR14TRequestStatus @ 25 NONAME ; RTestCase::NotifyRemoteType(TPckg<TStifCommand> &, TPckg<int> &, TRequestStatus &)
	OpenLoggerSession__11RTestEngineR17RTestEngineServerR15TLoggerSettings @ 26 NONAME R3UNUSED ; RTestEngine::OpenLoggerSession(RTestEngineServer &, TLoggerSettings &)
	Open__11RTestEngineR17RTestEngineServerRCt4TBuf1i256 @ 27 NONAME R3UNUSED ; RTestEngine::Open(RTestEngineServer &, TBuf<256> const &)
	Open__9RTestCaseR17RTestEngineServerRCt5TPckg1Z9TTestInfo @ 28 NONAME R3UNUSED ; RTestCase::Open(RTestEngineServer &, TPckg<TTestInfo> const &)
	Pause__9RTestCase @ 29 NONAME R3UNUSED ; RTestCase::Pause(void)
	ReadLoggerSettingsFromIniFile__14RSettingServerR15TLoggerSettings @ 30 NONAME R3UNUSED ; RSettingServer::ReadLoggerSettingsFromIniFile(TLoggerSettings &)
	RemoveConfigFile__11RTestEngineRCt4TBuf1i128RCt4TBuf1i256 @ 31 NONAME R3UNUSED ; RTestEngine::RemoveConfigFile(TBuf<128> const &, TBuf<256> const &)
	RemoveTestModule__11RTestEngineRCt4TBuf1i128 @ 32 NONAME R3UNUSED ; RTestEngine::RemoveTestModule(TBuf<128> const &)
	Resume__9RTestCase @ 33 NONAME R3UNUSED ; RTestCase::Resume(void)
	RunTestCase__9RTestCaseRt5TPckg1Z15TFullTestResultR14TRequestStatus @ 34 NONAME R3UNUSED ; RTestCase::RunTestCase(TPckg<TFullTestResult> &, TRequestStatus &)
	SetAttribute__11RTestEngine10TAttributeRC7TDesC16 @ 35 NONAME R3UNUSED ; RTestEngine::SetAttribute(TAttribute, TDesC16 const &)
	SetIniFileInformation__14RSettingServerRCt4TBuf1i256 @ 36 NONAME R3UNUSED ; RSettingServer::SetIniFileInformation(TBuf<256> const &)
	SetNewIniFileSetting__14RSettingServerRt4TBuf1i128 @ 37 NONAME R3UNUSED ; RSettingServer::SetNewIniFileSetting(TBuf<128> &)
	StartEngine__Fv @ 38 NONAME R3UNUSED ; StartEngine(void)
	StartNewServer__FRt4TBuf1i128 @ 39 NONAME R3UNUSED ; StartNewServer(TBuf<128> &)
	Version__C14RSettingServer @ 40 NONAME R3UNUSED ; RSettingServer::Version(void) const
	Version__C17RTestEngineServer @ 41 NONAME R3UNUSED ; RTestEngineServer::Version(void) const
	"_._26CSTIFTestFrameworkSettings" @ 42 NONAME R3UNUSED ; CSTIFTestFrameworkSettings::~CSTIFTestFrameworkSettings(void)
	AddConfigFile__11RTestEngineRCt4TBuf1i128RCt4TBuf1i256 @ 43 NONAME R3UNUSED ; RTestEngine::AddConfigFile(TBuf<128> const &, TBuf<256> const &)

