
diff -r 000000000000 -r 3da2a79470a7 testtoolsconn/stat/desktop/source/dll/statd.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/testtoolsconn/stat/desktop/source/dll/statd.def	Mon Mar 08 15:04:18 2010 +0800
@@ -0,0 +1,45 @@
+LIBRARY statd
+EXPORTS
+	Version
+	GetError
+	GetErrorText
+	SetConnectionLogging
+	CloseConnectionLogging
+	Connect
+	ConnectMT
+	Disconnect
+	SetCommandDelay
+	SetCommandLogging
+	SetImageVerification
+	GetCommandCount
+	GetCurrentCommandNumber
+	OpenScriptFile
+	RunScript
+	SendRawCommand
+	SendCommandFile
+	StopProcessing
+	GetSnapshot
+	GetTEFSharedData
+	GetReceivedData
+
+	StdVersion 							= _StdVersion@0
+	StdSetConnectionLogging				= _StdSetConnectionLogging@4
+	StdCloseConnectionLogging			= _StdCloseConnectionLogging@0
+	StdDisconnect 						= _StdDisconnect@4
+	StdGetCommandCount					= _StdGetCommandCount@12
+	StdGetCurrentCommandNumber			= _StdGetCurrentCommandNumber@8
+	StdOpenScriptFile					= _StdOpenScriptFile@12
+	StdRunScript						= _StdRunScript@8
+	StdSendRawCommand 					= _StdSendRawCommand@12
+	StdSendCommandFile 					= _StdSendCommandFile@12
+	StdStopProcessing					= _StdStopProcessing@4
+	StdGetError							= _StdGetError@4
+	StdGetErrorText						= _StdGetErrorText@8
+	StdConnect							= _StdConnect@16
+	StdConnectMT						= _StdConnectMT@8
+	StdSetCommandDelay					= _StdSetCommandDelay@8
+	StdSetCommandLogging				= _StdSetCommandLogging@28
+	StdSetImageVerification 			= _StdSetImageVerification@16
+	StdGetSnapshot						= _StdGetSnapshot@20
+	StdGetTEFSharedData					= _StdGetTEFSharedData@4
+	StdGetReceivedData					= _StdGetReceivedData@4




