
diff -r bbd31066657e -r 8bb370ba6d1d testexecfw/stf/examples/testmeasurementstub/Bmarm/STIFTESTMEASUREMENTSTUBU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/testexecfw/stf/examples/testmeasurementstub/Bmarm/STIFTESTMEASUREMENTSTUBU.DEF	Fri Apr 09 10:46:28 2010 +0800
@@ -0,0 +1,3 @@
+EXPORTS
+	LibEntryL__FRC7TDesC16Q220CSTIFTestMeasurement20TSTIFMeasurementType @ 1 NONAME R3UNUSED ; LibEntryL(TDesC16 const &, CSTIFTestMeasurement::TSTIFMeasurementType)
+




