
diff -r 7f0174848f99 -r 483f966c6335 common/tools/ats/smoketest/Timew/bmarm/CONSOLEALARMALERTSERVERU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/common/tools/ats/smoketest/Timew/bmarm/CONSOLEALARMALERTSERVERU.DEF	Fri May 29 08:07:21 2009 +0100
@@ -0,0 +1,2 @@
+EXPORTS
+	StartConsoleAlarmAlertServerL__23ConsoleAlarmAlertServerPv @1 NONAME ; public: static void __cdecl ConsoleAlarmAlertServer::StartConsoleAlarmAlertServerL(void *)




