EXPORTS
	FactoryL__14CPbkExtGlobals @ 1 NONAME R3UNUSED ; CPbkExtGlobals::FactoryL(void)
	InstanceL__14CPbkExtGlobals @ 2 NONAME R3UNUSED ; CPbkExtGlobals::InstanceL(void)

