
diff -r 2dac0fdba72b -r 191387a8b767 photosgallery/viewframework/medialists/tsrc/eabi/t_cglxgarbagecollectoru.def
--- a/photosgallery/viewframework/medialists/tsrc/eabi/t_cglxgarbagecollectoru.def	Wed Apr 14 15:57:24 2010 +0300
+++ b/photosgallery/viewframework/medialists/tsrc/eabi/t_cglxgarbagecollectoru.def	Tue Apr 27 16:37:53 2010 +0300
@@ -48,7 +48,7 @@
 	_ZNK9TGlxMedia5TitleEv @ 47 NONAME
 	_ZNK9TGlxMedia7CommentEv @ 48 NONAME
 	_ZNK9TGlxMedia7GetDateER5TTime @ 49 NONAME
-	_ZNK9TGlxMedia7GetSizeERi @ 50 NONAME
+	_ZNK9TGlxMedia7GetSizeERj @ 50 NONAME
 	_ZNK9TGlxMedia8CategoryEv @ 51 NONAME
 	_ZNK9TGlxMedia8IsStaticEv @ 52 NONAME
 	_ZNK9TGlxMedia8MimeTypeEv @ 53 NONAME




