
diff -r 26673e532f65 -r 159fc2f68139 ImagePrint/ImagePrintEngine/DeviceProtocols/pictbridge2/eabi/pdphotolibu.def
--- a/ImagePrint/ImagePrintEngine/DeviceProtocols/pictbridge2/eabi/pdphotolibu.def	Tue May 25 12:42:41 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,9 +0,0 @@
-EXPORTS
-	_Z24ImplementationGroupProxyRi @ 1 NONAME
-	_ZTI10CPBConnect @ 2 NONAME ; #<TI>#
-	_ZTI17CPBPrintingDevice @ 3 NONAME ; #<TI>#
-	_ZTI8CPBEvent @ 4 NONAME ; #<TI>#
-	_ZTV10CPBConnect @ 5 NONAME ; #<VT>#
-	_ZTV17CPBPrintingDevice @ 6 NONAME ; #<VT>#
-	_ZTV8CPBEvent @ 7 NONAME ; #<VT>#
-




