
diff -r 000000000000 -r d11fb78c4374 ImagePrint/ImagePrintEngine/DeviceProtocols/pictbridge2/eabi/pdphotolibu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/ImagePrint/ImagePrintEngine/DeviceProtocols/pictbridge2/eabi/pdphotolibu.def	Thu Dec 17 08:45:53 2009 +0200
@@ -0,0 +1,9 @@
+EXPORTS
+	_Z24ImplementationGroupProxyRi @ 1 NONAME
+	_ZTI10CPBConnect @ 2 NONAME ; #<TI>#
+	_ZTI17CPBPrintingDevice @ 3 NONAME ; #<TI>#
+	_ZTI8CPBEvent @ 4 NONAME ; #<TI>#
+	_ZTV10CPBConnect @ 5 NONAME ; #<VT>#
+	_ZTV17CPBPrintingDevice @ 6 NONAME ; #<VT>#
+	_ZTV8CPBEvent @ 7 NONAME ; #<VT>#
+




