
diff -r 30e048a7b597 -r bad0cc58d154 wlansecuritysettings/wifiprotectedsetup/eabi/wifiprotpluginu.def
--- a/wlansecuritysettings/wifiprotectedsetup/eabi/wifiprotpluginu.def	Thu Aug 19 09:58:27 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,11 +0,0 @@
-EXPORTS
-	_Z13NotifierArrayv @ 1 NONAME
-	_ZN20CWifiProtUiInProcess12StartFromUiLERK5TBuf8ILi32EEiR6RArrayImE @ 2 NONAME
-	_ZN20CWifiProtUiInProcess4NewLEP13RCmManagerExt @ 3 NONAME
-	_ZTI19CWiFiProtDlgsPlugin @ 4 NONAME ; #<TI>#
-	_ZTI20CWifiProtUiInProcess @ 5 NONAME ; #<TI>#
-	_ZTI21CWiFiProtActiveRunner @ 6 NONAME ; #<TI>#
-	_ZTV19CWiFiProtDlgsPlugin @ 7 NONAME ; #<VT>#
-	_ZTV20CWifiProtUiInProcess @ 8 NONAME ; #<VT>#
-	_ZTV21CWiFiProtActiveRunner @ 9 NONAME ; #<VT>#
-




