
diff -r bad0cc58d154 -r c74b3d9f6b9e eapol/eapol_framework/eapol_symbian/eabi/eapcoreinterfaceu.def
--- a/eapol/eapol_framework/eapol_symbian/eabi/eapcoreinterfaceu.def	Tue Aug 31 15:16:37 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,18 +0,0 @@
-EXPORTS
-	_Z30new_eap_am_client_message_if_cP18abs_eap_am_tools_cbm @ 1 NONAME
-	_ZN17CEapCoreInterface11set_partnerEP23abs_eap_am_message_if_c @ 2 NONAME
-	_ZN17CEapCoreInterface12get_is_validEv @ 3 NONAME
-	_ZN17CEapCoreInterface12process_dataEPKvm @ 4 NONAME
-	_ZN17CEapCoreInterface8SendDataEPKvi @ 5 NONAME
-	_ZN17CEapCoreInterface8shutdownEv @ 6 NONAME
-	_ZN17CEapCoreInterface9ConstrucLEP18abs_eap_am_tools_c @ 7 NONAME
-	_ZN17CEapCoreInterface9configureEPK19eap_variable_data_c @ 8 NONAME
-	_ZTI17CEapCoreInterface @ 9 NONAME
-	_ZTV17CEapCoreInterface @ 10 NONAME
-	_ZThn4_N17CEapCoreInterface8SendDataEPKvi @ 11 NONAME
-	_ZThn8_N17CEapCoreInterface11set_partnerEP23abs_eap_am_message_if_c @ 12 NONAME
-	_ZThn8_N17CEapCoreInterface12get_is_validEv @ 13 NONAME
-	_ZThn8_N17CEapCoreInterface12process_dataEPKvm @ 14 NONAME
-	_ZThn8_N17CEapCoreInterface8shutdownEv @ 15 NONAME
-	_ZThn8_N17CEapCoreInterface9configureEPK19eap_variable_data_c @ 16 NONAME
-




