
diff -r 7333d7932ef7 -r 8b7f4e561641 installationservices/swi/test/eabi/swicaptests_usifU.def
--- a/installationservices/swi/test/eabi/swicaptests_usifU.def	Tue Aug 31 15:21:33 2010 +0300
+++ b/installationservices/swi/test/eabi/swicaptests_usifU.def	Wed Sep 01 12:22:02 2010 +0100
@@ -50,8 +50,4 @@
 	_ZTI40CSwiLauncherSisRegistryServerUtilCapTest @ 49 NONAME
 	_ZTV36CSwiLauncherInstallServerUtilCapTest @ 50 NONAME
 	_ZTV40CSwiLauncherSisRegistryServerUtilCapTest @ 51 NONAME
-	_ZTI22CSisLauncherSwiSidTest @ 52 NONAME
-	_ZTI22CSisRegistryTCBCapTest @ 53 NONAME
-	_ZTV22CSisLauncherSwiSidTest @ 54 NONAME
-	_ZTV22CSisRegistryTCBCapTest @ 55 NONAME
 




