
diff -r 7333d7932ef7 -r 8b7f4e561641 installationservices/swinstallationfw/test/securitytests/eabi/usifsecuritytests-tcbu.def
--- a/installationservices/swinstallationfw/test/securitytests/eabi/usifsecuritytests-tcbu.def	Tue Aug 31 15:21:33 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,5 +0,0 @@
-EXPORTS
-	_Z21CapabilityTestFactoryv @ 1 NONAME
-	_ZTI23CSifSecurityContextTest @ 2 NONAME
-	_ZTV23CSifSecurityContextTest @ 3 NONAME
-




