EXPORTS
	??0ASTstAlarmTest@@QAE@XZ @ 1 NONAME ; public: __thiscall ASTstAlarmTest::ASTstAlarmTest(void)
	??RASTstAlarmTest@@QAEXH@Z @ 2 NONAME ; public: void __thiscall ASTstAlarmTest::operator()(int)
	??RASTstAlarmTest@@QAEXHH@Z @ 3 NONAME ; public: void __thiscall ASTstAlarmTest::operator()(int,int)
	??RASTstAlarmTest@@QAEXHHPBG@Z @ 4 NONAME ; public: void __thiscall ASTstAlarmTest::operator()(int,int,unsigned short const *)
	?Close@ASTstAlarmTest@@SAXXZ @ 5 NONAME ; public: static void __cdecl ASTstAlarmTest::Close(void)
	?CountOrphanedAlarmsL@ASTstAlarmTest@@QAEHXZ @ 6 NONAME ; public: int __thiscall ASTstAlarmTest::CountOrphanedAlarmsL(void)
	?EndL@ASTstAlarmTest@@QAEXXZ @ 7 NONAME ; public: void __thiscall ASTstAlarmTest::EndL(void)
	?Next@ASTstAlarmTest@@QAEXABVTDesC16@@@Z @ 8 NONAME ; public: void __thiscall ASTstAlarmTest::Next(class TDesC16 const &)
	?Self@ASTstAlarmTest@@SAAAV1@XZ @ 9 NONAME ; public: static class ASTstAlarmTest & __cdecl ASTstAlarmTest::Self(void)
	?Start@ASTstAlarmTest@@QAEXABVTDesC16@@@Z @ 10 NONAME ; public: void __thiscall ASTstAlarmTest::Start(class TDesC16 const &)
	?TestClearStoreL@ASTstAlarmTest@@QAEXXZ @ 11 NONAME ; public: void __thiscall ASTstAlarmTest::TestClearStoreL(void)
	?TestEventBuffer@ASTstAlarmTest@@QAEXHAAVTRequestStatus@@AAH@Z @ 12 NONAME ; public: void __thiscall ASTstAlarmTest::TestEventBuffer(int,class TRequestStatus &,int &)
	?TestStartServers@ASTstAlarmTest@@QAEXPAX@Z @ 13 NONAME ; public: void __thiscall ASTstAlarmTest::TestStartServers(void *)
	?Title@ASTstAlarmTest@@QAEXXZ @ 14 NONAME ; public: void __thiscall ASTstAlarmTest::Title(void)
	?WaitForEvent@ASTstAlarmTest@@QAEXHAAVTRequestStatus@@AAH@Z @ 15 NONAME ; public: void __thiscall ASTstAlarmTest::WaitForEvent(int,class TRequestStatus &,int &)
	?WaitForNotificationBufferToBeEmptied@ASTstAlarmTest@@QAEXAAVTRequestStatus@@AAH@Z @ 16 NONAME ; public: void __thiscall ASTstAlarmTest::WaitForNotificationBufferToBeEmptied(class TRequestStatus &,int &)
	?UpLevel@ASTstAlarmTest@@QAEXXZ @ 17 NONAME ; void ASTstAlarmTest::UpLevel(void)

