
diff -r 613943a21004 -r 9386f31cc85b btobexprofiles/obexsendservices/eabi/obexservicesendutilsu.DEF
--- a/btobexprofiles/obexsendservices/eabi/obexservicesendutilsu.DEF	Tue Aug 31 15:25:10 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,16 +0,0 @@
-EXPORTS
-	_ZN13CBTServiceAPI13StartServiceLE14TBTServiceTypeP23CBTServiceParameterList @ 1 NONAME
-	_ZN13CBTServiceAPI24StartSynchronousServiceLE14TBTServiceTypeP23CBTServiceParameterList @ 2 NONAME
-	_ZN13CBTServiceAPI4NewLEv @ 3 NONAME
-	_ZN23CBTServiceParameterList10AddObjectLE5RFile @ 4 NONAME
-	_ZN23CBTServiceParameterList10AddObjectLERK7TDesC16 @ 5 NONAME
-	_ZN23CBTServiceParameterList4NewLEv @ 6 NONAME
-	_ZN23CBTServiceParameterList5NewLCEv @ 7 NONAME
-	_ZN23CBTServiceParameterList9AddImageLE5RFile @ 8 NONAME
-	_ZN23CBTServiceParameterList9AddImageLERK7TDesC16 @ 9 NONAME
-	_ZN23CBTServiceParameterList9AddXhtmlLERK7TDesC16 @ 10 NONAME
-	_ZTI13CBTServiceAPI @ 11 NONAME ; #<TI>#
-	_ZTI23CBTServiceParameterList @ 12 NONAME ; #<TI>#
-	_ZTV13CBTServiceAPI @ 13 NONAME ; #<VT>#
-	_ZTV23CBTServiceParameterList @ 14 NONAME ; #<VT>#
-




