
diff -r 000000000000 -r 2f259fa3e83a commonuisupport/uikon/test/EABI/TNOTIFY2V2U.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/commonuisupport/uikon/test/EABI/TNOTIFY2V2U.def	Tue Feb 02 01:00:49 2010 +0200
@@ -0,0 +1,14 @@
+EXPORTS
+	_Z24ImplementationGroupProxyRi @ 1 NONAME
+	_Z13NotifierArrayv @ 2 NONAME
+	_Z14NotifierArray1v @ 3 NONAME
+	_Z14NotifierArray2v @ 4 NONAME
+	_ZTI21CMySmsNotifierSubject @ 5 NONAME ; #<TI>#
+	_ZTI23CMyEmailNotifierSubject @ 6 NONAME ; #<TI>#
+	_ZTI24CMyLEDSmsNotifierSubject @ 7 NONAME ; #<TI>#
+	_ZTI26CMyLEDEmailNotifierSubject @ 8 NONAME ; #<TI>#
+	_ZTV21CMySmsNotifierSubject @ 9 NONAME ; #<VT>#
+	_ZTV23CMyEmailNotifierSubject @ 10 NONAME ; #<VT>#
+	_ZTV24CMyLEDSmsNotifierSubject @ 11 NONAME ; #<VT>#
+	_ZTV26CMyLEDEmailNotifierSubject @ 12 NONAME ; #<VT>#
+




