
diff -r 000000000000 -r 2f259fa3e83a commonuisupport/uikon/test/EABI/TNOTIFYV2U.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/commonuisupport/uikon/test/EABI/TNOTIFYV2U.def	Tue Feb 02 01:00:49 2010 +0200
@@ -0,0 +1,16 @@
+EXPORTS
+	_Z24ImplementationGroupProxyRi @ 1 NONAME
+	_Z13NotifierArrayv @ 2 NONAME
+	_ZTI23CMyPhoneNotifierSubject @ 3 NONAME ; #<TI>#
+	_ZTI24CMyAgendaNotifierSubject @ 4 NONAME ; #<TI>#
+	_ZTI26CMyLEDPhoneNotifierSubject @ 5 NONAME ; #<TI>#
+	_ZTI27CMyLEDAgendaNotifierSubject @ 6 NONAME ; #<TI>#
+	_ZTI28CMyLowBatteryNotifierSubject @ 7 NONAME ; #<TI>#
+	_ZTI31CMyLEDLowBatteryNotifierSubject @ 8 NONAME ; #<TI>#
+	_ZTV23CMyPhoneNotifierSubject @ 9 NONAME ; #<VT>#
+	_ZTV24CMyAgendaNotifierSubject @ 10 NONAME ; #<VT>#
+	_ZTV26CMyLEDPhoneNotifierSubject @ 11 NONAME ; #<VT>#
+	_ZTV27CMyLEDAgendaNotifierSubject @ 12 NONAME ; #<VT>#
+	_ZTV28CMyLowBatteryNotifierSubject @ 13 NONAME ; #<VT>#
+	_ZTV31CMyLEDLowBatteryNotifierSubject @ 14 NONAME ; #<VT>#
+




