
diff -r 000000000000 -r 2f259fa3e83a uifw/AvKon/AknListLoaderTfx/eabi/aknlistloadertfxu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/uifw/AvKon/AknListLoaderTfx/eabi/aknlistloadertfxu.def	Tue Feb 02 01:00:49 2010 +0200
@@ -0,0 +1,12 @@
+EXPORTS
+	_ZN14CAknListLoader11CreateTfxGcER11CEikListBox @ 1 NONAME
+	_ZN14CAknListLoader11CreateTfxGcER12CEikMenuPaneRiS2_ @ 2 NONAME
+	_ZN14CAknListLoader11RemoveTfxGcEP9CWindowGc @ 3 NONAME
+	_ZN14CAknListLoader13InvalidateAllEv @ 4 NONAME
+	_ZN14CAknListLoader14TfxApiInternalEP9CWindowGc @ 5 NONAME
+	_ZN14CAknListLoader6TfxApiEP9CWindowGc @ 6 NONAME
+	_ZTI14CAknListLoader @ 7 NONAME ; #<TI>#
+	_ZTV14CAknListLoader @ 8 NONAME ; #<VT>#
+	_ZN14CAknListLoader11CreateTfxGcER12CAknTreeListRiS2_S2_S2_ @ 9 NONAME
+	_ZN14CAknListLoader11CreateTfxGcER11CCoeControl @ 10 NONAME
+




