
diff -r 000000000000 -r 0e761a78d257 gst_plugins_symbian/eabi/libgstdevsoundextu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/gst_plugins_symbian/eabi/libgstdevsoundextu.def	Thu Dec 17 08:53:32 2009 +0200
@@ -0,0 +1,10 @@
+EXPORTS
+	gst_error_concealment_get_type @ 1 NONAME
+	gst_g711_decoder_get_type @ 2 NONAME
+	gst_g711_encoder_get_type @ 3 NONAME
+	gst_g729_decoder_get_type @ 4 NONAME
+	gst_g729_encoder_get_type @ 5 NONAME
+	gst_ilbc_decoder_get_type @ 6 NONAME
+	gst_ilbc_encoder_get_type @ 7 NONAME
+	gst_speech_encoder_config_get_type @ 8 NONAME
+




