
diff -r 4c282e7dd6d3 -r 5505e8908944 gst_plugins_symbian/tsrc/gstreamertestmodule/eabi/GStreamerTestClassu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/gst_plugins_symbian/tsrc/gstreamertestmodule/eabi/GStreamerTestClassu.def	Fri Jan 22 09:59:59 2010 +0200
@@ -0,0 +1,9 @@
+EXPORTS
+	_Z9LibEntryLR13CTestModuleIf @ 1 NONAME
+	_ZTI11CGstObjects @ 2 NONAME ; #<TI>#
+	_ZTI14CSimpleTimeout @ 3 NONAME ; #<TI>#
+	_ZTV11CGstObjects @ 4 NONAME ; #<VT>#
+	_ZTV14CSimpleTimeout @ 5 NONAME ; #<VT>#
+	_ZTI17CGlibEventHandler @ 6 NONAME ; #<TI>#
+	_ZTV17CGlibEventHandler @ 7 NONAME ; #<VT>#
+




