EXPORTS
	_GST_PLUGIN_DESC @ 1 NONAME
	audioresample_buffer_new @ 2 NONAME
	audioresample_buffer_new_and_alloc @ 3 NONAME
	audioresample_buffer_new_subbuffer @ 4 NONAME
	audioresample_buffer_new_with_data @ 5 NONAME
	audioresample_buffer_queue_flush @ 6 NONAME
	audioresample_buffer_queue_free @ 7 NONAME
	audioresample_buffer_queue_get_depth @ 8 NONAME
	audioresample_buffer_queue_get_offset @ 9 NONAME
	audioresample_buffer_queue_new @ 10 NONAME
	audioresample_buffer_queue_peek @ 11 NONAME
	audioresample_buffer_queue_pull @ 12 NONAME
	audioresample_buffer_queue_push @ 13 NONAME
	audioresample_buffer_ref @ 14 NONAME
	audioresample_buffer_unref @ 15 NONAME
	functable_calculate @ 16 NONAME
	functable_calculate_multiply @ 17 NONAME
	functable_evaluate @ 18 NONAME
	functable_fir @ 19 NONAME
	functable_fir2 @ 20 NONAME
	functable_free @ 21 NONAME
	functable_func_boxcar @ 22 NONAME
	functable_func_hanning @ 23 NONAME
	functable_func_sinc @ 24 NONAME
	functable_new @ 25 NONAME
	functable_set_length @ 26 NONAME
	functable_set_multiplier @ 27 NONAME
	functable_set_offset @ 28 NONAME
	gst_audioresample_get_type @ 29 NONAME
	resample_add_input_data @ 30 NONAME
	resample_format_size @ 31 NONAME
	resample_free @ 32 NONAME
	resample_get_input_size_for_output @ 33 NONAME
	resample_get_output_data @ 34 NONAME
	resample_get_output_size @ 35 NONAME
	resample_get_output_size_for_input @ 36 NONAME
	resample_init @ 37 NONAME
	resample_input_eos @ 38 NONAME
	resample_input_flush @ 39 NONAME
	resample_input_pushthrough @ 40 NONAME
	resample_new @ 41 NONAME
	resample_scale_chunk @ 42 NONAME
	resample_scale_functable @ 43 NONAME
	resample_scale_ref @ 44 NONAME
	resample_set_filter_length @ 45 NONAME
	resample_set_format @ 46 NONAME
	resample_set_input_rate @ 47 NONAME
	resample_set_method @ 48 NONAME
	resample_set_n_channels @ 49 NONAME
	resample_set_output_rate @ 50 NONAME

