EXPORTS
	_ZN10CIrWatcher4NewLER3RFsR11CWatcherLog @ 1 NONAME
	_ZTI10CIrWatcher @ 2 NONAME ; #<TI>#
	_ZTV10CIrWatcher @ 3 NONAME ; #<VT>#

