
diff -r 000000000000 -r 14df0fbfcc4e sapi_contacts_vpbk/eabi/contactproviderarm.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/sapi_contacts_vpbk/eabi/contactproviderarm.def	Mon Mar 30 12:51:10 2009 +0300
@@ -0,0 +1,14 @@
+EXPORTS
+	_Z24ImplementationGroupProxyRi @ 1 NONAME
+	_ZN17CContactInterface11ExecuteCmdLERK6TDesC8RK20CLiwGenericParamListRS3_jP18MLiwNotifyCallback @ 2 NONAME
+	_ZN17CContactInterface4NewLEv @ 3 NONAME
+	_ZTI16CContactIterator @ 4 NONAME ; #<TI>#
+	_ZTI16CContactProvider @ 5 NONAME ; #<TI>#
+	_ZTI17CContactInterface @ 6 NONAME ; #<TI>#
+	_ZTI25CContactInterfaceCallback @ 7 NONAME ; #<TI>#
+	_ZTV16CContactIterator @ 8 NONAME ; #<VT>#
+	_ZTV16CContactProvider @ 9 NONAME ; #<VT>#
+	_ZTV17CContactInterface @ 10 NONAME ; #<VT>#
+	_ZTV25CContactInterfaceCallback @ 11 NONAME ; #<VT>#
+	_ZThn4_N17CContactInterface11ExecuteCmdLERK6TDesC8RK20CLiwGenericParamListRS3_jP18MLiwNotifyCallback @ 12 NONAME ; #<thunk>#
+




