
diff -r 4096754ee773 -r 52a167391590 localconnectivityservice/obexsendservices/eabi/obexservicesendutilsu.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/localconnectivityservice/obexsendservices/eabi/obexservicesendutilsu.DEF	Wed Sep 01 12:20:40 2010 +0100
@@ -0,0 +1,16 @@
+EXPORTS
+	_ZN13CBTServiceAPI13StartServiceLE14TBTServiceTypeP23CBTServiceParameterList @ 1 NONAME
+	_ZN13CBTServiceAPI24StartSynchronousServiceLE14TBTServiceTypeP23CBTServiceParameterList @ 2 NONAME
+	_ZN13CBTServiceAPI4NewLEv @ 3 NONAME
+	_ZN23CBTServiceParameterList10AddObjectLE5RFile @ 4 NONAME
+	_ZN23CBTServiceParameterList10AddObjectLERK7TDesC16 @ 5 NONAME
+	_ZN23CBTServiceParameterList4NewLEv @ 6 NONAME
+	_ZN23CBTServiceParameterList5NewLCEv @ 7 NONAME
+	_ZN23CBTServiceParameterList9AddImageLE5RFile @ 8 NONAME
+	_ZN23CBTServiceParameterList9AddImageLERK7TDesC16 @ 9 NONAME
+	_ZN23CBTServiceParameterList9AddXhtmlLERK7TDesC16 @ 10 NONAME
+	_ZTI13CBTServiceAPI @ 11 NONAME
+	_ZTI23CBTServiceParameterList @ 12 NONAME
+	_ZTV13CBTServiceAPI @ 13 NONAME
+	_ZTV23CBTServiceParameterList @ 14 NONAME
+




