
diff -r 000000000000 -r f5a58ecadc66 upnp/upnpstack/ssdpserver/eabi/SSDPServeru.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/upnp/upnpstack/ssdpserver/eabi/SSDPServeru.def	Tue Feb 02 01:12:20 2010 +0200
@@ -0,0 +1,14 @@
+EXPORTS
+	_ZN14CUpnpUdpServer15AddressChangedLER9TInetAddr @ 1 NONAME
+	_ZN15CUpnpSsdpServer15AdvertiseAliveLER25CUpnpDeviceLibraryElement @ 2 NONAME
+	_ZN15CUpnpSsdpServer16AdvertiseByebyeLER25CUpnpDeviceLibraryElement @ 3 NONAME
+	_ZN15CUpnpSsdpServer4NewLEP23MUpnpSsdpServerObserverP11RSocketServi @ 4 NONAME
+	_ZN15CUpnpSsdpServer4NewLEP23MUpnpSsdpServerObserverP11RSocketServiPS_ @ 5 NONAME
+	_ZN15CUpnpSsdpServer4StopEv @ 6 NONAME
+	_ZN15CUpnpSsdpServer6StartLEv @ 7 NONAME
+	_ZN15CUpnpSsdpServer7SearchLER6TDesC8 @ 8 NONAME
+	_ZN15CUpnpSsdpServer7SearchLER6TDesC8S1_ @ 9 NONAME
+	_ZN15CUpnpSsdpServerD0Ev @ 10 NONAME
+	_ZN15CUpnpSsdpServerD1Ev @ 11 NONAME
+	_ZN15CUpnpSsdpServerD2Ev @ 12 NONAME
+




