
diff -r e1bea15f9a39 -r 79859ed3eea9 browserutilities/connectionmanager/BWinsCw/CONNECTIONMANAGERU_EKA2U.def
--- a/browserutilities/connectionmanager/BWinsCw/CONNECTIONMANAGERU_EKA2U.def	Thu Aug 19 10:58:56 2010 +0300
+++ b/browserutilities/connectionmanager/BWinsCw/CONNECTIONMANAGERU_EKA2U.def	Tue Aug 31 16:17:46 2010 +0300
@@ -43,5 +43,4 @@
 	?StartNotificationL@CConnectionStageNotifierWCB@@QAEXPAV?$TBuf@$0IA@@@PAHHPAVMConnectionMultiStageObserver@@H@Z @ 42 NONAME ; void CConnectionStageNotifierWCB::StartNotificationL(class TBuf<128> *, int *, int, class MConnectionMultiStageObserver *, int)
 	?StopConnectionL@CInternetConnectionManager@@QAEXXZ @ 43 NONAME ; void CInternetConnectionManager::StopConnectionL(void)
 	?UnsetApChangeObserver@CInternetConnectionManager@@UAEXXZ @ 44 NONAME ; void CInternetConnectionManager::UnsetApChangeObserver(void)
-	?GetProgressBuffer@CConnectionStageNotifierWCB@@QAE?AV?$TPckgBuf@VTNifProgress@@@@XZ @ 45 NONAME ; class TPckgBuf<class TNifProgress> CConnectionStageNotifierWCB::GetProgressBuffer(void)
 




