
diff -r 79859ed3eea9 -r 919f36ff910f browserutilities/connectionmanager/EABI/CONNECTIONMANAGERU_EKA2U.def
--- a/browserutilities/connectionmanager/EABI/CONNECTIONMANAGERU_EKA2U.def	Tue Aug 31 16:17:46 2010 +0300
+++ b/browserutilities/connectionmanager/EABI/CONNECTIONMANAGERU_EKA2U.def	Wed Sep 01 12:28:30 2010 +0100
@@ -124,3 +124,5 @@
 	_ZN26CInternetConnectionManager17SetConnectionTypeEN9CMManager23TCmSettingSelectionModeE @ 123 NONAME
 	_ZThn8_N26CInternetConnectionManager16SetRequestedSnapEm @ 124 NONAME ; #<thunk>#
 	_ZThn8_N26CInternetConnectionManager17SetConnectionTypeEN9CMManager23TCmSettingSelectionModeE @ 125 NONAME ; #<thunk>#
+	_ZN27CConnectionStageNotifierWCB17GetProgressBufferEv @ 126 NONAME
+




