
diff -r 000000000000 -r 29b1cd4cb562 bthci/hciextensioninterface/eabi/hciproxyU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/bthci/hciextensioninterface/eabi/hciproxyU.DEF	Fri Jan 15 08:13:17 2010 +0200
@@ -0,0 +1,12 @@
+EXPORTS
+	_ZN20CHciExtensionConduit10ConstructLEv @ 1 NONAME
+	_ZN20CHciExtensionConduit12WaitForEventEv @ 2 NONAME
+	_ZN20CHciExtensionConduit13IssueCommandLEtRK6TDesC8 @ 3 NONAME
+	_ZN20CHciExtensionConduit19StopWaitingForEventEv @ 4 NONAME
+	_ZN20CHciExtensionConduit4NewLER25MVendorSpecificHciConduit @ 5 NONAME
+	_ZN20CHciExtensionConduitD0Ev @ 6 NONAME
+	_ZN20CHciExtensionConduitD1Ev @ 7 NONAME
+	_ZN20CHciExtensionConduitD2Ev @ 8 NONAME
+	_ZN20CHciExtensionConduit24CommandCompleteEventDataER6TPtrC8 @ 9 NONAME
+	_ZN20CHciExtensionConduit35IssueCommandExpectingCompleteEventLEtRK6TDesC8 @ 10 NONAME
+




