
diff -r 000000000000 -r 4e1aa6a622a0 hwrmhaptics/hapticspluginservice/eabi/hwrmhapticspluginserviceu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/hwrmhaptics/hapticspluginservice/eabi/hwrmhapticspluginserviceu.def	Tue Feb 02 00:53:00 2010 +0200
@@ -0,0 +1,18 @@
+EXPORTS
+	_ZN20CHWRMHapticsRespData12InternalizeLER11RReadStream @ 1 NONAME
+	_ZN20CHWRMHapticsRespData4DataEv @ 2 NONAME
+	_ZN20CHWRMHapticsRespData5NewLCEiRK6TDesC8 @ 3 NONAME
+	_ZN20CHWRMHapticsRespData9ErrorCodeEv @ 4 NONAME
+	_ZN20CHWRMHapticsRespDataD0Ev @ 5 NONAME
+	_ZN20CHWRMHapticsRespDataD1Ev @ 6 NONAME
+	_ZN20CHWRMHapticsRespDataD2Ev @ 7 NONAME
+	_ZN25CHWRMHapticsPluginService4NewLE4TUidP26MHWRMHapticsPluginCallback @ 8 NONAME
+	_ZN25CHWRMHapticsPluginServiceD0Ev @ 9 NONAME
+	_ZN25CHWRMHapticsPluginServiceD1Ev @ 10 NONAME
+	_ZN25CHWRMHapticsPluginServiceD2Ev @ 11 NONAME
+	_ZNK20CHWRMHapticsRespData12ExternalizeLER12RWriteStream @ 12 NONAME
+	_ZTI20CHWRMHapticsRespData @ 13 NONAME ; #<TI>#
+	_ZTI25CHWRMHapticsPluginService @ 14 NONAME ; #<TI>#
+	_ZTV20CHWRMHapticsRespData @ 15 NONAME ; #<VT>#
+	_ZTV25CHWRMHapticsPluginService @ 16 NONAME ; #<VT>#
+




