
diff -r 000000000000 -r 4e1aa6a622a0 resourcemgmt/hwresourcesmgr/common/eabi/HWRMCommon_extpowerinfoU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/resourcemgmt/hwresourcesmgr/common/eabi/HWRMCommon_extpowerinfoU.DEF	Tue Feb 02 00:53:00 2010 +0200
@@ -0,0 +1,24 @@
+EXPORTS
+	_ZN25CHWRMVibraProfileObserver4NewLEP25MHWRMVibraProfileObserver @ 1 NONAME
+	_ZN25CHWRMVibraProfileObserverD0Ev @ 2 NONAME
+	_ZN25CHWRMVibraProfileObserverD1Ev @ 3 NONAME
+	_ZN25CHWRMVibraProfileObserverD2Ev @ 4 NONAME
+	_ZTI25CHWRMVibraProfileObserver @ 5 NONAME ; #<TI>#
+	_ZTV25CHWRMVibraProfileObserver @ 6 NONAME ; #<VT>#
+	_ZN21CHwrmUiPluginResolver17GetDesiredPluginLER4TUid @ 7 NONAME
+	_ZN21CHwrmUiPluginResolver4NewLEv @ 8 NONAME
+	_ZN21CHwrmUiPluginResolver5NewLCEv @ 9 NONAME
+	_ZN21CHwrmUiPluginResolverD0Ev @ 10 NONAME
+	_ZN21CHwrmUiPluginResolverD1Ev @ 11 NONAME
+	_ZN21CHwrmUiPluginResolverD2Ev @ 12 NONAME
+	_ZN8CIniFile4NewLERK7TDesC16S2_ @ 13 NONAME
+	_ZN8CIniFile7FindVarERK7TDesC16S2_R7TPtrC16 @ 14 NONAME
+	_ZN8CIniFileD0Ev @ 15 NONAME
+	_ZN8CIniFileD1Ev @ 16 NONAME
+	_ZN8CIniFileD2Ev @ 17 NONAME
+	_ZN25CHWRMVibraProfileObserver17GetVibraModeStateEv @ 18 NONAME
+	_ZN25CHWRMVibraProfileObserver25GetVibraFeedbackModeStateEv @ 19 NONAME
+	_ZN19CPsPropertyObserver3GetERK4TUidiRi @ 20 NONAME
+	_ZN19CPsPropertyObserver4NewLERK4TUidiR19MPsPropertyObserver @ 21 NONAME
+	_ZN19CPsPropertyObserver3GetERi @ 22 NONAME
+




