
diff -r 000000000000 -r 4e1aa6a622a0 resourcemgmt/vibractrl/BWINS/VIBRACTRLU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/resourcemgmt/vibractrl/BWINS/VIBRACTRLU.DEF	Tue Feb 02 00:53:00 2010 +0200
@@ -0,0 +1,9 @@
+EXPORTS
+	?NewL@VibraFactory@@SAPAVCVibraControl@@PAVMVibraControlObserver@@@Z @ 1 NONAME ; public: static class CVibraControl * __cdecl VibraFactory::NewL(class MVibraControlObserver *)
+	?NewL@VibraFactory@@SAPAVCVibraControl@@XZ @ 2 NONAME ; public: static class CVibraControl * __cdecl VibraFactory::NewL(void)
+	?NewLC@VibraFactory@@SAPAVCVibraControl@@PAVMVibraControlObserver@@@Z @ 3 NONAME ; public: static class CVibraControl * __cdecl VibraFactory::NewLC(class MVibraControlObserver *)
+	?StartVibraL@CVibraControlImpl@@UAEXG@Z @ 4 NONAME ; public: virtual void __thiscall CVibraControlImpl::StartVibraL(unsigned short)
+	?StartVibraL@CVibraControlImpl@@UAEXGH@Z @ 5 NONAME ; public: virtual void __thiscall CVibraControlImpl::StartVibraL(unsigned short,int)
+	?StopVibraL@CVibraControlImpl@@UAEXXZ @ 6 NONAME ; public: virtual void __thiscall CVibraControlImpl::StopVibraL(void)
+	?VibraSettings@CVibraControlImpl@@UBE?AW4TVibraModeState@CVibraControl@@XZ @ 7 NONAME ; public: virtual enum CVibraControl::TVibraModeState  __thiscall CVibraControlImpl::VibraSettings(void)const 
+




