
diff -r 000000000000 -r 4e1aa6a622a0 sysstatemgmt/ssmcustcmds/ssmsystemcmds/bwins/ssmsystemcmdsu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/sysstatemgmt/ssmcustcmds/ssmsystemcmds/bwins/ssmsystemcmdsu.def	Tue Feb 02 00:53:00 2010 +0200
@@ -0,0 +1,9 @@
+EXPORTS
+	?InitPsKeysNewL@SsmSystemCmdsFactory@@SAPAVMSsmCustomCommand@@XZ @ 1 NONAME ; class MSsmCustomCommand * SsmSystemCmdsFactory::InitPsKeysNewL(void)
+	?InitStartupReasonNewL@SsmSystemCmdsFactory@@SAPAVMSsmCustomCommand@@XZ @ 2 NONAME ; class MSsmCustomCommand * SsmSystemCmdsFactory::InitStartupReasonNewL(void)
+	?InitCriticalLevelsNewL@SsmSystemCmdsFactory@@SAPAVMSsmCustomCommand@@XZ @ 3 NONAME ; class MSsmCustomCommand * SsmSystemCmdsFactory::InitCriticalLevelsNewL(void)
+	0 @ 4 ABSENT; absent
+	?WaitForPsKeyExactNewL@SsmSystemCmdsFactory@@SAPAVMSsmCustomCommand@@XZ @ 5 NONAME ; class MSsmCustomCommand * SsmSystemCmdsFactory::WaitForPsKeyExactNewL(void)
+	?WaitForPsKeyRangeNewL@SsmSystemCmdsFactory@@SAPAVMSsmCustomCommand@@XZ @ 6 NONAME ; class MSsmCustomCommand * SsmSystemCmdsFactory::WaitForPsKeyRangeNewL(void)
+	?SaShutdownNewL@SsmSystemCmdsFactory@@SAPAVMSsmCustomCommand@@XZ @ 7 NONAME ; class MSsmCustomCommand * SsmSystemCmdsFactory::SaShutdownNewL(void)
+




