
diff -r 000000000000 -r 4e1aa6a622a0 sysstatemgmt/systemstatereferenceplugins/clayer/eabi/starterclientu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/sysstatemgmt/systemstatereferenceplugins/clayer/eabi/starterclientu.def	Tue Feb 02 00:53:00 2010 +0200
@@ -0,0 +1,15 @@
+EXPORTS
+	_ZN15RStarterSession7ConnectEv @ 1 NONAME
+	_ZN15RStarterSession8SetStateENS_12TGlobalStateE @ 2 NONAME
+	_ZN15RStarterSession5ResetENS_12TResetReasonE @ 3 NONAME
+	_ZN15RStarterSession8ShutdownEv @ 4 NONAME
+	_ZN15RStarterSession26ActivateRfForEmergencyCallEv @ 5 NONAME
+	_ZN15RStarterSession30DeactivateRfAfterEmergencyCallEv @ 6 NONAME
+	_ZN15RStarterSession19AddItemInStartListLERK7TDesC1615TMonitoringMode9TItemTypei @ 7 NONAME ABSENT 
+	_ZN15RStarterSession24RemoveItemFromStartListLERK7TDesC16 @ 8 NONAME ABSENT 
+	_ZN15RStarterSession16SearchStartlistLERK7TDesC16 @ 9 NONAME ABSENT 
+	_ZN15RStarterSession19AddItemInStartListLERK7TDesC1615TMonitoringMode9TItemTypei6TPtrC8 @ 10 NONAME ABSENT 
+	_ZN15RStarterSession14IsRTCTimeValidEv @ 11 NONAME
+	_ZN15RStarterSession15EndSplashScreenEv @ 12 NONAME
+	_ZN15RStarterSession12ResetNetworkEv @ 13 NONAME
+




