EXPORTS
	?NewL@CHWRMVibra@@SAPAV1@PAVMHWRMVibraObserver@@@Z @ 1 NONAME ; class CHWRMVibra * CHWRMVibra::NewL(class MHWRMVibraObserver *)
	?NewL@CHWRMVibra@@SAPAV1@XZ @ 2 NONAME ; class CHWRMVibra * CHWRMVibra::NewL(void)
	?NewLC@CHWRMVibra@@SAPAV1@PAVMHWRMVibraObserver@@@Z @ 3 NONAME ; class CHWRMVibra * CHWRMVibra::NewLC(class MHWRMVibraObserver *)
	?NewLC@CHWRMVibra@@SAPAV1@XZ @ 4 NONAME ; class CHWRMVibra * CHWRMVibra::NewLC(void)

