
diff -r 000000000000 -r 5d03bc08d59c windowing/windowserver/eabi/DLOGU.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/windowing/windowserver/eabi/DLOGU.DEF	Tue Feb 02 01:47:50 2010 +0200
@@ -0,0 +1,9 @@
+EXPORTS
+	_ZN9CDebugLog10ConstructLEiR7TDesC16 @ 1 NONAME
+	_ZN9CDebugLogC1EP15CDebugLogDevice @ 2 NONAME
+	_ZN9CDebugLogC2EP15CDebugLogDevice @ 3 NONAME
+	_ZTI9CDebugLog @ 4 NONAME ; #<TI>#
+	_ZTV17TDebugLogOverflow @ 5 NONAME ; #<VT>#
+	_ZTV9CDebugLog @ 6 NONAME ; #<VT>#
+	_ZTI17TDebugLogOverflow @ 7 NONAME ; #<TI>#
+




