
diff -r 000000000000 -r 5d03bc08d59c windowing/windowserver/eabi/wsgdcovu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/windowing/windowserver/eabi/wsgdcovu.def	Tue Feb 02 01:47:50 2010 +0200
@@ -0,0 +1,10 @@
+EXPORTS
+	_ZN13CWsGdCoverage11QueryPluginER15TGdCoverageInfo @ 1 NONAME
+	_ZN13CWsGdCoverage11SetCallBackE9TCallBack @ 2 NONAME
+	_ZN13CWsGdCoverage4NewLEi @ 3 NONAME
+	_ZN13CWsGdCoverage4NewLEv @ 4 NONAME
+	_ZN13CWsGdCoverage7RunTestEi @ 5 NONAME
+	_ZN13CWsGdCoverageD0Ev @ 6 NONAME
+	_ZN13CWsGdCoverageD1Ev @ 7 NONAME
+	_ZN13CWsGdCoverageD2Ev @ 8 NONAME
+




