
diff -r 000000000000 -r 5d03bc08d59c windowing/windowserver/eabi/wsbufferdraweru.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/windowing/windowserver/eabi/wsbufferdraweru.def	Tue Feb 02 01:47:50 2010 +0200
@@ -0,0 +1,15 @@
+EXPORTS
+	_ZN16CWsBufferGraphic13HandleMessageERK6TDesC8 @ 1 NONAME
+	_ZN16CWsBufferGraphic13ShareGloballyEv @ 2 NONAME
+	_ZN16CWsBufferGraphic15UnShareGloballyEv @ 3 NONAME
+	_ZN16CWsBufferGraphic18UpdateWhiteLinePosEi @ 4 NONAME
+	_ZN16CWsBufferGraphic4NewLE4TUid @ 5 NONAME
+	_ZN16CWsBufferGraphic4NewLERK12TWsGraphicId @ 6 NONAME
+	_ZN16CWsBufferGraphic4NewLEv @ 7 NONAME
+	_ZN16CWsBufferGraphic5ShareE9TSecureId @ 8 NONAME
+	_ZN16CWsBufferGraphic7UnShareE9TSecureId @ 9 NONAME
+	_ZN16CWsBufferGraphic9OnReplaceEv @ 10 NONAME
+	_ZN16CWsBufferGraphicD0Ev @ 11 NONAME
+	_ZN16CWsBufferGraphicD1Ev @ 12 NONAME
+	_ZN16CWsBufferGraphicD2Ev @ 13 NONAME
+




