
diff -r 3406c99bc375 -r 07b41fa8d1dd stif/examples/STIFTestMeasurementStub/Bmarm/STIFTESTMEASUREMENTSTUBU.DEF
--- a/stif/examples/STIFTestMeasurementStub/Bmarm/STIFTESTMEASUREMENTSTUBU.DEF	Thu Jul 15 20:25:38 2010 +0300
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,3 +0,0 @@
-EXPORTS
-	LibEntryL__FRC7TDesC16Q220CSTIFTestMeasurement20TSTIFMeasurementType @ 1 NONAME R3UNUSED ; LibEntryL(TDesC16 const &, CSTIFTestMeasurement::TSTIFMeasurementType)
-




