
diff -r 000000000000 -r 2c201484c85f contentmgmt/contentaccessfwfordrm/BWINS/streamingcafu.def
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/contentmgmt/contentaccessfwfordrm/BWINS/streamingcafu.def	Wed Jul 08 11:25:26 2009 +0100
@@ -0,0 +1,20 @@
+EXPORTS
+	??0CAgentKeyStreamDecoder@StreamAccess@@IAE@XZ @ 1 NONAME ; StreamAccess::CAgentKeyStreamDecoder::CAgentKeyStreamDecoder(void)
+	??0CStreamAgentFactory@StreamAccess@@IAE@XZ @ 2 NONAME ; StreamAccess::CStreamAgentFactory::CStreamAgentFactory(void)
+	??1CAgentKeyStreamDecoder@StreamAccess@@UAE@XZ @ 3 NONAME ; StreamAccess::CAgentKeyStreamDecoder::~CAgentKeyStreamDecoder(void)
+	??1CKeyAssociation@StreamAccess@@UAE@XZ @ 4 NONAME ; StreamAccess::CKeyAssociation::~CKeyAssociation(void)
+	??1CStreamAgentFactory@StreamAccess@@UAE@XZ @ 5 NONAME ; StreamAccess::CStreamAgentFactory::~CStreamAgentFactory(void)
+	?CreateImportSessionLC@CKeyStreamDecoder@StreamAccess@@QBEPAVCImportFile@ContentAccess@@ABVTDesC8@@@Z @ 6 NONAME ; class ContentAccess::CImportFile * StreamAccess::CKeyStreamDecoder::CreateImportSessionLC(class TDesC8 const &) const
+	?CreateImportSessionLC@CKeyStreamDecoder@StreamAccess@@QBEPAVCImportFile@ContentAccess@@ABVTDesC8@@ABVTDesC16@@1@Z @ 7 NONAME ; class ContentAccess::CImportFile * StreamAccess::CKeyStreamDecoder::CreateImportSessionLC(class TDesC8 const &, class TDesC16 const &, class TDesC16 const &) const
+	?CreateKeyStreamSinkLC@CIpSecProtectedStreamDesc@StreamAccess@@UBEPAVCKeyStreamSink@2@XZ @ 8 NONAME ; class StreamAccess::CKeyStreamSink * StreamAccess::CIpSecProtectedStreamDesc::CreateKeyStreamSinkLC(void) const
+	?ExternalizeLC@CKeyStreamSink@StreamAccess@@QBE?AVTPtr8@@XZ @ 9 NONAME ; class TPtr8 StreamAccess::CKeyStreamSink::ExternalizeLC(void) const
+	?GetAttributeL@CKeyStreamDecoder@StreamAccess@@QBEXABW4TAttribute@2@AAH@Z @ 10 NONAME ; void StreamAccess::CKeyStreamDecoder::GetAttributeL(enum StreamAccess::TAttribute const &, int &) const
+	?GetStringAttributeLC@CKeyStreamDecoder@StreamAccess@@QBEPAVHBufC16@@ABW4TStringAttribute@2@@Z @ 11 NONAME ; class HBufC16 * StreamAccess::CKeyStreamDecoder::GetStringAttributeLC(enum StreamAccess::TStringAttribute const &) const
+	?InternalizeLC@CKeyStreamSink@StreamAccess@@SAPAV12@ABVTDesC8@@@Z @ 12 NONAME ; class StreamAccess::CKeyStreamSink * StreamAccess::CKeyStreamSink::InternalizeLC(class TDesC8 const &)
+	?NewL@CIpSecKeyAssociation@StreamAccess@@SAPAV12@JPAVHBufC8@@0@Z @ 13 NONAME ; class StreamAccess::CIpSecKeyAssociation * StreamAccess::CIpSecKeyAssociation::NewL(long, class HBufC8 *, class HBufC8 *)
+	?NewL@CKeyStreamDecoder@StreamAccess@@SAPAV12@ABVCProtectedStreamDesc@2@ABVCSdpMediaField@@ABVCSdpDocument@@@Z @ 14 NONAME ; class StreamAccess::CKeyStreamDecoder * StreamAccess::CKeyStreamDecoder::NewL(class StreamAccess::CProtectedStreamDesc const &, class CSdpMediaField const &, class CSdpDocument const &)
+	?NewLC@CIpSecKeyAssociation@StreamAccess@@SAPAV12@JPAVHBufC8@@0@Z @ 15 NONAME ; class StreamAccess::CIpSecKeyAssociation * StreamAccess::CIpSecKeyAssociation::NewLC(long, class HBufC8 *, class HBufC8 *)
+	?NewLC@CIpSecProtectedStreamDesc@StreamAccess@@SAPAV12@ABVTInetAddr@@0@Z @ 16 NONAME ; class StreamAccess::CIpSecProtectedStreamDesc * StreamAccess::CIpSecProtectedStreamDesc::NewLC(class TInetAddr const &, class TInetAddr const &)
+	?NewLC@CKeyStreamDecoder@StreamAccess@@SAPAV12@ABVCProtectedStreamDesc@2@ABVCSdpMediaField@@ABVCSdpDocument@@@Z @ 17 NONAME ; class StreamAccess::CKeyStreamDecoder * StreamAccess::CKeyStreamDecoder::NewLC(class StreamAccess::CProtectedStreamDesc const &, class CSdpMediaField const &, class CSdpDocument const &)
+	?KCafLoadPostProductionAgents@@3EB @ 18 NONAME ; unsigned char const KCafLoadPostProductionAgents
+




