EXPORTS
	_ZN18CServerOOMTestStop4NewLER3RFsR12CConsoleBaseR6OutputRK15TTestActionSpec @ 1 NONAME
	_ZN19CServerOOMTestStart4NewLER3RFsR12CConsoleBaseR6OutputRK15TTestActionSpec @ 2 NONAME
	_ZN21CCheckServerHeapError4NewLER3RFsR12CConsoleBaseR6OutputRK15TTestActionSpec @ 3 NONAME

